Figure 1. The Leo Triplet Member NGC 3628.

H i: VLA D-array, 60^{′′} resolution, contours=3.2, 4.8, 6.4, 8, 9.6, 16×10^{19} cm^{−2}. Optical: Top two panels: DSS, FOV=22^′×8^′. Third panel: DSS, FOV=66^′× 22^′. Bottom panel: Palomar 48^{′′} Schmidt (B) second blue survey with highcontrast development by James Schombert, FOV=39^′ × 10^′. Notes: The dotted boxes in the third panel delineates the regions shown in the other panels.

Reference: Appleton & Hughes, these proceedings, p. ??.