Figure 1. The NGC 7463/4/5 System.

H i: VLA C-array, 22^{′′} × 17^{′′}, contours=(2.5, 6, 9, 12, 27) × 10^{20} cm^{−2}. Optical: Top two panels: DSS. Bottom: Issac Newton Telescope B-band. FOV=8^′ × 6^′.

Notes: NGC 7463 is also detected in Hi, but this emission is not shown here. Reference: Thomas et al., these proceedings, p. ??.