Figure 1. The NGC 7714/15 System.

H i: VLA B+C+D-array, 11^{′′} × 8.5^{′′} resolution, contours=2 × 10^{20} cm^{−2} × 2^n. Optical: DSS, FOV=6^′ × 3^′.

Reference: Smith, B.J. 1991, ApJ, 393, 544 and Smith, B.J., Struck, C., & Pogge, R.W. 1997, ApJ, 483, 754.