Figure 1. The Blue Compact Dwarf I Zw 18.

H i: VLA B+C+D-array, 8.8^{′′} ×8.3^{′′} resolution, contours=4×10^{19} cm^{−2} ×2^n. Optical: WFPC F555W image from HST, FOV=2^′ × 3^′.

Reference: van Zee, L., Westpfahl, D., & Haynes, M. P. 1998, AJ, 115, 1000.