Figure 1. The Polar Ring Galaxy System VV 324 (II Zw 70/71). H i: VLA C+D-array, 22.5^{′′} × 20^{′′} resolution.

Optical: Top two panels: DSS, FOV=6^′ × 5^′. Bottom panel: B-band image from OSU Imaging Fabry-Pérot Spectrometer.

Reference: Cox, A.L., Sparke, L.S., Watson, A.M., & van Moorsel, G., 2001, AJ, 121, 692.