Figure 1. H i in low-redshift QSOs.

H i: VLA C-array. FWHM resolution indicated by circle drawn in lower left panel of each plot.

Optical: DSS, except for I Zw 1 taken from the Hubble Space Telescope archive.

Notes: The QSO and its host galaxy (where visible) is shown magnified in the lower right inset of each panel.

Reference: Lim, J., & Ho, P.T.P. 1999, ApJ, 510, L7, and Lim et al., these proceedings, p. ??.