Figure 1. The Arp 31 System.

H i: VLA D-array, 56^{′′}, contours=(1.4, 4.1, 12.3, 27.3, 61.6) × 10^{19} cm^{−2}. Optical: DSS, FOV=8^′ × 13^′.

Notes: Members of the NGC 691 group. See Fig. ??. Reference: van Moorsel, G. A., 1988, A&A, 202, 59.