Figure 1. The Arp 78 System.

H i: VLA D-array, 54^{′′} × 52^{′′} resolution, contours=4.4 × 10^{18} cm^{−2} × 2^n. Optical: DSS, FOV=19^′ × 16^′.

Notes: The two galaxies are at approximately the same redshift. Reference: Iyer et al., these proceedings, p. ??.