Figure 1. The Arp 105 System.

H i: VLA C+D-array, 23^{′′} × 21^{′′} resolution, contours=4.4 × 10^{19} cm^{−2} × 2^n. Optical: CFHT 4m V -band, FOV=4^′ × 6^′. Notes: In the cluster Abell 1185.

Reference: Duc, P. -A., Brinks, E., Wink, J. E., & Mirabel, I. F. 1997, A&A, 326, 537.