Figure 1. The Ring Galaxy NGC 2444/5.

H i: VLA C+D-array, 28^{′′} resolution, contours=4 × 10^{19} cm^{−2} × 2^n. Optical: KPNO 0.9m B-band, FOV=13^′ × 17^′.

Reference: Appleton, P. N., Ghigo, F. D, van Gorkom, J. H., Schombert, J. M., & Struck-Marcell, C. 1987, Nature, 330, 140.