Figure 1. The IR luminous merger Arp 220.

H i: VLA C+D-array. Upper right: 30^{′′} resolution, contours=2 × 10^{19} cm^{−2} × 2^n. Lower left: 20^{′′} resolution, contours=5 × 10^{19} cm^{−2} × 2^n. Optical: Upper panels: UH 88^{′′} R-band, FOV=7^′ × 6^′. Lower panels: DSS, FOV=16^′ × 10^′ (right) 3^′ × 3^′ (left).

Notes: The dotted boxes in the lower right panel delineate the regions shown in the other panels. IC 4554 is at a higher redshift than Arp 220, so presumably a background galaxy. The companion to the northeast has no cataloged counterpart.

Reference: Yun & Hibbard, these proceedings p. ??. See also Hibbard, J. E., Vacca, W. D., & Yun, M. S. 2000, AJ, 119, 1130.