Figure 1. The Arp 227 Shell System.

H i: VLA D-array, 49^{′′} × 46^{′′} resolution, contours=1 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=17^′ × 20^′.

Notes: The lower right panel shows an expanded field of view, showing an Hi detected companion to the south. The dotted box shows the region imaged in the other three panels.

Reference: Schiminovich et al., these proceedings, p. ??.