Figure 1. The Shell Galaxy Arp 230.

H i: VLA B+C-array, 15^{′′} resolution, contours=1 × 10^{20} cm^{−2} × 2^n. Optical: DSS, FOV=5^′ × 5^′.

Reference: Schiminovich, D., van Gorkom, J.H., & van der Hulst, J.M., 2001, AJ, submitted. See also Schiminovich, these proceedings, p. ??.