Figure 1. The Arp 263 System.

H i: VLA D-array, 64.3^{′′} × 54.6^{′′} resolution, contours=5 × 10^{18} cm^{−2} × 2^n. Optical: DSS, FOV=15^′ × 14^′.

Notes: The galaxies marked in parenthesis have redshifts which place them in the background. CGCG 094-040 has no known redshift. Reference: Iyer et al., these proceedings, p. ??.