Figure 1. The Arp 271 System.

H i: VLA C+D-array, 35^{′′} × 27^{′′} resolution, contours=4 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=16^′ × 11^′.

Notes: The Arp 271 companion is associated with a cataloged APMUKS object (B140004.67-054920.9). The LCRS object has redshift only 10 km s^{−1} different from Arp 271.

Reference: Clemens, M. S., 1998, Ph.D. Thesis, Cambridge University.