Figure 1. The Arp 295 System.

H i: VLA C+D-array, 26^{′′} resolution, contours=4 × 10^{19} cm^{−2} × 2^n. Optical: KPNO 0.9m V -band, FOV=15^′ × 15^′.

Notes: The Hi detected companion [Hv96] G9 lies 21^′ to the southeast. Reference: Hibbard, J. E., & van Gorkom, J. H. 1996, AJ, 111, 655.