Figure 1. The IR luminous merger Arp 299.

H i: VLA C+D-array. Lower left: 21^{′′} resolution, contours=4 × 10^{19} cm^{−2} × 2^n. Lower right: 35^{′′} resolution. Optical: UH 88^{′′} B-band, FOV=9^′ × 12^′. Notes: There is a small Hi detected companion 10^′ to the west of Arp 299. Reference: Hibbard, J. E., & Yun, M. S. 1999, AJ, 118, 162.