Figure 1. The Arp 314 System.

: VLA D-array, 72^{′′} resolution, contours=1 × 10^{19} cm^{−2} × 2^n. Optical: Palomar 5m Gunn r, FOV=11^′ × 11^′.

Reference: Nordgren, T. E., Chengalur, J. N., Salpeter, E. E., & Terzian, Y. 1997, AJ, 114, 913