Figure 1. The Lindsay-Shapley Ring.

H i: ATCA, 12.2^{′′} × 9.4^{′′} resolution, contours=2 × 10^{20} cm^{−2} × 2^n. Optical: DSS, FOV=3.6^′ × 4.3^′.

Reference: Higdon et al., these proceedings, p. ??.