Figure 1. The E+A Galaxy EA 1.

H i: VLA C-array, 26.0^{′′} × 19.3^{′′} resolution, contours=3 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=2.6^′ × 2.6^′.

Notes: Selected for having a post-starburst or “E+A” (a.k.a. “K+A”) spectrum.

Reference: Chang, T-C., van Gorkom, J. H., Zabludoff, A. I., Zaritsky, D., & Mihos, J. C. 2001, AJ, 121, 1965 and Chang et al., these proceedings, p. ??.