Figure 1. The Compact Group HCG 26.

H i: VLA C-array, 30^{′′} resolution, contours=2 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=5.8^′ × 4.5^′.

Reference: Williams, B. A., & van Gorkom, J. H. 1995, in ASP Conf. Ser., Vol. 70, Groups of Galaxies, ed. O. G.Richter and K. Borne (ASP, SF), 77. See also Verdes-Montenegro, these proceedings, p. ??.