Figure 1. The Compact Group HCG 90.

H i: VLA D-array, 44^{′′} × 38^{′′} resolution, contours=4 × 10^{20} cm^{−2} × 2^n. Optical: DSS, FOV=20^′ × 14^′.

Notes: All galaxies with known redshifts falling within the passband of the Hi observations have been labeled.

Reference: Rupen, Hibbard & Bunker, these proceedings, p. ??.