Figure 1. Stephan’s Quintet.

H i: VLA B+D-array, 19.7^{′′} × 18.8^{′′} resolution, contours=5 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=7.6^′ × 6^′.

Notes: There are three other small Hi detected members of the group found outside of the region shown.

Reference: Williams et al., these proceedings, p. ??.