Figure 1. The Compact Group HCG 95.

H i: VLA C+D-array, 23^{′′} × 16^{′′} resolution, contours=1 × 10^{20} cm^{−2} × 2^n. Optical: 3.5m Calar Alto B-band, FOV=5^′ × 3^′.

Reference: Verdes-Montenegro, L., Yun, M. S., Williams, B. A., Huchtmeier, W. K., Del Olmo, A., & Perea, J. 2000, IAU Colloq. 174, Small Galaxy Groups, ed. M. Valtonen & C. Flynn (San Francisco: ASP), 167. See also Verdes-Montenegro, these proceedings, p. ??.