Figure 1. The Compact Group HCG 96.

H i: VLA C+D-array, 33^{′′} × 25^{′′} resolution. Right hand panels: contours=3 × 10^{19} cm^{−2}×2^n. Bottom left panel: contours=(0.5, 1, 1.5, 2, 3.5, 5)×10^{20} cm^{−2}. Optical: Bottom left: Nordic Optical Telescope R-band. Others: DSS, FOV=11^′ × 11^′.

Notes: The dotted box in the top left panel shows the region displayed in the bottom left panel.

Reference: Verdes-Montenegro et al., these proceedings, p. ??. See also Verdes-Montenegro, these proceedings, p. ?? and Mundell, these proceedings, p. ??.