Figure 1. The Local Group dwarf Irregular IC 10. H i: VLA B+C+D-array, 11^{′′} resolution, lowest contour=5 × 10^{19} cm^{−2}. Optical: DSS, FOV=15^′ × 15^′ (top), 25^′ × 25^′ (bottom).

Notes: The dotted box in the lower left panel delineates the region of the optical images shown in the upper two panels.

Reference: Wilcots, E.M., & Miller, B.W., 1998, AJ, 116, 2363.