Figure 1. The IC 3355 System.

H i: VLA D-array, 58^{′′} × 48^{′′} resolution, contours=2 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=8^′ × 7^′.

Notes: Member of the Virgo cluster near M 86. See also Fig. ??. Reference: Observed in the field of NGC 4406 (M 86) by Li & van Gorkom, these proceedings, p. ??.