Figure 1. M51: The Whirlpool Galaxy.

H i: VLA C+D-array, 34^{′′} resolution, contours=4 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=26^′ × 29^′.

Reference: Rots, A. H., Bosma, A., van der Hulst, J. M., Athanassoula, E., & Crane, P. C. 1990, AJ, 100, 387. See also Miller, Bregman & Wakker, these proceedings, p. ??.