Figure 1. The M 83 System.

H i: ATCA 9-point mosaic + Parkes 64m, 62^{′′} × 38^{′′} resolution. Optical: DSS, FOV=60^′ × 60^′.

Reference: Park et al., these proceedings, p. ??.