Figure 1. The NGC 92 System.

H i: ATCA, 104^{′′} × 52^{′′} resolution, contours=1, 3, ..., ×10^{19} cm^{−2}. Optical: DSS, FOV=7^′ × 6^′.

Reference: Oosterloo, T., & Iovina, A., 1997, PASA, 14, 48.