Figure 1. The NGC 1012 System.

H i: VLA D-array, 19.7^{′′}× resolution, contours=8 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=13^′ × 16^′.

Reference: Hogg & Roberts, these proceedings, p. ??.