Figure 1. The NGC 1052 System.

H i: VLA D-array, 60^{′′} × 60^{′′} resolution, contour levels = (1.5, 6.0, 10.7, 18.3, 27.5, 36.5) × 10^{19} cm^{−2}.

Optical: DSS, FOV=14^′ × 14^′ (top), 31^′ × 28^′ (bottom).

Reference: van Gorkom, J. H., Knapp, G. R., Raimond, E., Faber, S. M., Gallagher, J. S. 1986, AJ, 91, 791.