Figure 1. The Shell Galaxy NGC 1210.

H i: VLA C+D-array, 52^{′′} × 36^{′′} resolution, contours=4 × 10^{19} cm^{−2} × 2^n. Optical: Left: DSS. Upper right: deep optical image from David Malin. FOV=7.0^′ × 5.7^′ Reference: Schiminovich et al., these proceedings, p. ??.