Figure 1. The NGC 2146 System.

H i: Combined VLA D-array plus NRAO 300^′ observations, 77^{′′} × 49^{′′} resolution, contours=3 × 10^{18} cm^{−2} × 2^n. Optical: DSS, FOV=16^′ × 16^′.

Notes: The redshift of the nearby galaxy NGC 2146A lies outside of the passband of the Hi observations.

Reference: Taramopoulos, A., Payne, H., & Briggs, F. H. 2001, A&A, 365, 360.