Figure 1. The NGC 2292/3 system.

H i: VLA D-array, 40^{′′} × 33^{′′} resolution, contours=5 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=9^′ × 8^′ and 19^′ × 27^′.

Notes: No Hi was detected from NGC 2295 or ESO 490-GO42, even though they have velocities within the range of the Hi observations. Reference: Rupen, Hibbard & Bunker, these proceedings, p. ??.