Figure 1. The Blue Compact Dwarf system NGC 2363/6. H i: VLA C-array, 17^{′′} × 15^{′′} resolution, contours=1 × 10^{20} cm^{−2} × 2^n. Optical: DSS, FOV=12^′ × 13^′.

Reference: Thuan, Hibbard & Levrier, these proceedings, p. ??. See also Hunter, D.A., Elmegreen, B.G., & van Woerden, H. 2001, ApJ, 556, 773.