Figure 1. The Amorphous Galaxy NGC 2777.

H i: VLA D-array, 52^{′′} × 47^{′′} resolution, contours=2.25 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=8^′ × 9^′.

Notes: The SA(r)ab galaxy NGC 2775 lies 10^′ to the south, and was also detected in the Hi observations. It has a regular disk-like Hi distribution. Reference: Hogg, D. E., Roberts, M. S., Schulman, E., & Knezek, P. M. 1998, AJ, 115, 502.