Figure 1. The Shell Galaxy NGC 2865.

H i: VLA B+C-array, 20^{′′} resolution, contours=3 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=10^′ × 12^′.

Reference: Schiminovich, D., van Gorkom, J. H., van der Hulst, J. M., & Malin, D. F. 1995, ApJ, 444, L77. See also Schiminovich, these proceedings, p. ??.