Figure 1. The NGC 2964/2968/2970 System. H i: VLA D-array, 60^{′′} × 51^{′′} resolution, contours=2 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=14^′ × 14^′.

Notes: This system was targeted because of the presence of the Type I supernova 1970 l that was observed to lie between NGC 2968 and NGC 2970. Reference: Tyson & van Gorkom, these proceedings, p. ??.