Figure 1. The Edge-on system NGC 3044. H i: VLA C-array, 14^{′′} resolution, contours=1 × 10^{20} cm^{−2} × 2^n. Optical: DSS, FOV=4^′ × 6^′.

Reference: Lee, S.-W. & Irwin, J.A. 1997, ApJ, 490, 247.