Figure 1. The NGC 3079 System.

H i: VLA D-array, contours=(0.5, 1, 1.5, 2.4, 4, 10, 15, 25, 45)×10^{20} cm^{−2}. Resolution: 48^{′′} × 40^{′′} NGC 3079; 67^{′′} × 57^{′′} others. Optical: DSS, FOV=19^′ × 17^′.

Reference: Irwin, J.A., Seaquist, E.R., Taylor, A.R., & Duric, N. 1987, ApJ, 313, L91.