Figure 1. The Toomre Sequence merger NGC 3256. H i: ATCA, 22.6^{′′} resolution, contours=(2.2, 3.2, 4.3, 22, 43) ×10^{19} cm^{−2}. Optical: Top panel: UH 88^{′′} R-band. Bottom panel: DSS, FOV=9^′ × 7^′. Notes: The nearby galaxies NGC 3256C, NGC 3262 and NGC 3263 were also detected in Hi as part of these observations.

Reference: English, J., Norris, R. P., Freeman, K. C., & Booth, R. S. 2001, AJ, in press.