Figure 1. The Arp 270 System.

H i: VLA C+D-array, 21^{′′} resolution, contours=1 × 10^{20} cm^{−2} × 2^n. Optical: DSS, FOV=6^′ × 4^′ (top), 15^′ × 19^′ (bottom).

Reference: Clemens, M. S., Baxter, K. M., Alexander, P., & Green, D. A. 1999, MNRAS, 308, 364.