Figure 1. The M 108 System.

H i: VLA D-array, 61^{′′} × 53^{′′} resolution, contours=1 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=24^′ × 11^′.

Notes: The redshift of MCG +09-19-001 is unknown. Reference: King, D., & Irwin, J. A. 1997, New Astronomy, 2, 251.