Figure 1. The Arp 280 System.

H i: VLA C+D-array, 23^{′′} × 22^{′′} resolution, contours=7 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=11^′ × 13^′.

Notes: Member of the Ursa Major Cluster. See also Fig. ??. Reference: Clemens, M. S., 1998, Ph.D. Thesis, Cambridge University.