Figure 1. The Toomre Sequence merger NGC 3921. H i: VLA C+D-array, 20^{′′} resolution, contours=3 × 10^{19} cm^{−2} × 2^n. Optical: KPNO 2.1m R-band, FOV=7^′ × 9^′ (top), 4^′ × 5^′ (bottom). Notes: MCG+09-19-213 falls on the edge of the passband of the Hi observations, so is not completely mapped in Hi.

Reference: Hibbard, J. E., & van Gorkom, J. H. 1996, AJ, 111, 655.