Figure 1. The NGC 3998 System.

H i: VLA D-array, 45^{′′} resolution, contours=2 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=15^′ × 15^′ (top), 40^′ × 37^′ (bottom).

Notes: One of the three brightest lenticulars in the Ursa Major cluster, all of which show disturbed Hi.

Reference: Verheijen & Zwaan, these proceedings, p. ??.