Figure 1. The NGC 4013 System.

H i: WSRT, 30^{′′} resolution, contours=1 × 10^{20} cm^{−2} × 2^n. Optical: DSS, FOV=11^′ × 11^′.

Notes: Member of the Ursa Major Cluster.

Reference: Bottema, R. 1995, A&A, 295, 605, and Verheijen, M. A. W., & Sancisi, R. 2001, A&A, 370, 765.