Figure 1. The NGC 4410 Group.

H i: VLA D-array, 58.4^{′′} × 54.7^{′′} resolution, contours=2 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=8^′ × 7^′ (top), 26^′ × 23^′ (bottom).

Reference: Smith, B.J., 2000, ApJ, 541, 624. See also Smith, Donahue & Stocke, these proceedings, p. ??.