Figure 1. NGC 4449: The “Jekyll & Hyde” Galaxy. H i: VLA D-array, 62^{′′} × 55^{′′} resolution, contours=5 × 10^{19} cm^{−2} × 2^n. Optical: DSS, FOV=90^′ × 90^′.

Reference: Hunter, D. A., Wilcots, E. M., van Woerden, H., Gallagher, J. S., & Kohle, S. 1998, ApJL, 495, L47.